PASGO is a command procedure which will compile, link and execute
your Pascal program in one step.  It will also delete the .OBJ file,
and all older versions of the .EXE files;  these files are not needed
and take up extra room on the disk.  Please use PASGO whenever you
have a Pascal program which need not be linked to other programs.

Any Pascal compiler switches may be specified.  The format for
PASGO is:

	PASGO <filename>[/switches]

The <filename> is the name of your source file.  Note that if your
source file does NOT have the filetype ".PAS", then the complete
file specification must be given (e.g., "MYPROG.TST" or "MYPROG.")

NOTE: The switch "/CHECK" is assumed, unless overridden "/NOCHECK".

For a description of the valid switches, see "HELP PASCAL QUAL".
Note that the "/OBJECT" and "/NOOBJECT" switches are not allowed.
Also if "/DEBUG" is specified, the "/DEBUG" is assumed in the
link and execute steps as well.

*examples
For simple compile, link and run of program TEST.PAS, type:
	PASGO TEST

To obtain a list file (type ".LIS"), and include a cross-reference
table, type:
	PASGO TEST/LIST/CROSS_REFERENCE

To debug a program named MYPROG.PAS, type
	PASGO MYPROG/DEBUG/LIST=LPA0:
This will cause the list file to be sent immediately to the printer
so you can have it ready for reference when the Debugger is initialized.
