
FILE:		COMPARE.HLP

CONTENTS:	FILE DESCRIBES A SUBMITAL TO THE VAX LIBRARY BY:

			THE FAIRFIELD ENGINEERING COMPANY
			324 BARNHART STREET
			MARION,OHIO  USA
			43302
			1-614-387-3327

DATE:		APRIL 12,1979

CONTACT:	THOMAS L. TERRALL


   # # # FILE COMPARE SYSTEM # # #

  { SYSTEM COMPARES TWO UNFORMATTED FILES IN A FORMATTED FORMAT }

	1. COMPARE.DOC

	   FILCMPR.DOC - DOCUMENTATION FILE FOR FILE COMPARE SYSTEM

	2. COMPARE.COM

	   FILECMPR.COM - PROCEDURE EXECUTES FILE COMPARE SYSTEM

	3. COMPARE.FOR

	   FILEDIF.FOR - PROGRAM DETECTS AND PRINTS DIFFERENCES BETWEEN
			 TWO FORMATTTED FILES

	   EXTRCTINT.FOR - SUBROUTINE MAY BE USED TO EXTRACT AN
		            INTEGER VALUE (INTEGER#2) FROM
			    AN INTERVAL IN A LINE OF CHARACTERS
