1 BAT

The BAT command submits any single DCL command or list of commands 
into the batch system.  This makes it easy to run jobs in batch 
without creating a .COM file every time.  Enter:

   BAT [DCL_command_string  [queue]]

The results of the command will be returned in the file BATCH.LOG in
the subdirectory from which the command was issued.  If the word
SHORT, LONG, or XLONG appears as a parameter, the respective
batch queue will be used.  The MEDIUM batch queue is used by default
(see HELP BATCH QUEUES).  If the DCL_command_string is omitted, you 
will be prompted for multiple commands to execute.
